Deprecated and Obsolete Elements

This section lists elements of HTML whose use should be avoided, whether because the element is now obsolete, or because the element is being deprecated (i.e. still supported, but its use is not recommended and the element may eventually become obsolete). Contents

(under const.) Obsolete Elements Several elements of HTML are , including PLAINTEXT, XMP, LISTING, HPx, and COMMENT. The first three should be replaced with ; HP (highlighted phrase) should be replaced with the ; and COMMENT should be replaced with <!--

blah blah blah -->, the SGML comment characters.

Deprecated Elements (Give me some time to fill this in. Like until who knows when? >=)

You may also want to

Go back to Return to the

Last modified: Apr 7, 1994